Table 1. Bias Model Parameters

Identifier Model 1 Model 2 Model 3 Model 4 Model 5 αi βi αf βf νp ρT α O3 0.47 0.03 0.61 -0.14 >1.00 0.67 O4 1.92 -2.16 2.87 -1.67 >0.64 0.17 O5 4.17 -8.44 2.24 -1.32 >0.30 0.03 L1 0.11 0.05 0.11 -0.02 >0.61 0.16 L2 0.50 -0.82 0.99 -0.50 <19.8 -0.02 L3 1.10 -3.08 1.84 -1.14 <17.3 -0.11 L4 2.04 -8.84 1.62 -1.00 <16.0 -0.13 L5 1.20 -15.46 0.91 -0.58 <12.7 -0.21 O2S 0.50 -42.17 0.97 -0.73 <11.2 -0.27 O3S 2.16 -14.27 1.57 -0.99 <15.6 -0.14 O4S 3.60 -9.05 2.17 -1.31 <19.7 -0.02 O5S 3.27 -4.90 2.48 -1.44 >0.48 0.08 L2S 0.49 -17.49 0.17 -0.16 <11.1 -0.27 L3S 2.55 -17.75 0.15 -0.06 <15.5 -0.13 L4S 3.74 -9.18 2.01 -1.18 <19.8 -0.02 L5S 3.18 -4.02 2.41 -1.39 >0.49 0.09 E1 1.39 -34.25 0.16 -0.13 <12.7 -0.19 E2 4.39 -3.42 4.00 -2.28 >1.03 0.61 E3Sa 1.10 -0.56 1.41 -0.59 1.005 >0.99 0.57 E3Sb 1.10 -0.56 1.13 -0.44 1.005 >0.97 0.55 E4 8.51 -6.85 3.97 -2.22 >1.09 0.67